<template>
  <div v-if="backdrop" class="relative h-[calc(100svh-6rem)] max-h-[calc(100svh-6rem)] w-full overflow-hidden">
    <NuxtPicture
      loading="lazy"
      class="w-full h-full object-cover object-center"
      :src="baseUrl + backdrop.url"
      :imgAttrs="{ class: 'w-full h-full object-cover object-center' }"
    />

    <img v-if="logo" class="absolute p-4 max-sm:w-full sm:h-40 bottom-5" :src="baseUrl + logo.url" />
    <img v-else class="absolute p-4 max-sm:w-full sm:h-40 bottom-5" src="/favicon.png" />

    <img
      class="absolute h-5 w-5 left-1/2 -translate-y-1/2 bottom-5 text-gray-400 p-2 box-content rounded-full bg-white cursor-pointer"
      src="/chevrons-down.svg"
      @click="scroll()"
    />
  </div>
  <Header />
  <slot />
  <Footer />
</template>

<script setup lang="ts">
import type Homepage from "../types/single/homepage";

const runtimeConfig = useRuntimeConfig();
const baseUrl = runtimeConfig.public.strapi.url;
const { findOne } = useStrapi();

const { logo } = useGlobal();

const { data: homepage } = await useAsyncData("homepage", () => findOne<Homepage>("homepage"));
const { backdrop } = homepage.value?.data ?? {};

function scroll() {
  window.scrollTo({ top: window.innerHeight - 96, behavior: "smooth" });
}
</script>
